\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}

\title{Simplified Three-Phase SSI for PV System Application Controlled via
Model Predictive Control}



\author[1]{Youssuf Elthokaby}%
\author[2]{Ibrahim Abdelsalam}%
\author[3]{Naser Abdel-Rahim}%
\author[1]{Islam Mohamed}%
\affil[1]{Benha University Faculty of Engineering at Shoubra}%
\affil[2]{Arab Academy for Science Technology and Maritime Transport - Cairo Campus}%
\affil[3]{Future University in Egypt}%


\vspace{-1em}



  
  \date{June 18, 2024}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
In this paper, for standalone and grid-connected PV systems, a
three-phase simplified split-source inverter (SSI) is proposed and
controlled using a model-predictive control (MPC). The maximum power
point tracking (MPPT) approach used is an incremental conductance method
based on a PI controller for both systems. The standalone system is
composed of PV modules, a three-phase SSI, and a bidirectional power
DC-DC converter that connects a battery bank and a DC-side capacitor.
The output AC voltages of SSI are controlled using model-predictive
control. The bidirectional power DC/DC converter regulates the DC-link
voltage (DCLV). The grid-connected system consists of PV modules, a
three-phase SSI, and an AC-side L-filter. The DC-link PI controller
generates reference currents for the MPC algorithm. The MPC uses these
reference currents to adjust and deliver the PV power to the grid while
regulating the DCLV. The PI controllers' parameters are selected for
both systems using the Harris Hawks optimization method. Both PV systems
simulation results show that under various operating conditions, they
have succeeded in fixing a DCLV and producing a high-quality AC output
voltage and current at low THD. Experimental results for the three-phase
standalone PV system used to verify the system's performance.%
\end{abstract}%



\sloppy


\textbf{Hosted file}

\verb`Simplified Three-Phase SSI for PV System Application.docx`  available at \url{https://authorea.com/users/622293/articles/645469-simplified-three-phase-ssi-for-pv-system-application-controlled-via-model-predictive-control}

\selectlanguage{english}
\FloatBarrier
\end{document}

